Syntax:
STD(expr)

Returns the population standard deviation of expr. This is an extension
to standard SQL. The standard SQL function STDDEV_POP() can be used
instead.

STD() returns NULL if there were no matching rows.

URL: http://dev.mysql.com/doc/refman/5.6/en/group-by-functions.html

